You should compare lines with square dots which are UA5’s minimum bias inelastic data. Blue +’s are non single diffractive data and biased to higher multiplicities.

Pseudo Rapidity

New Lund results are compared with

UA5 data at root s = 53, 200, 546 and

900 GeV (from below).